\\Genmidi.drv
General MIDI for Roland MPU MIDI interface
\\Genmidi.hlp
General MIDI for Roland MPU MIDI interface

This driver follows the IMA spec for General MIDI.
This will work on such devices as the Roland 
Sound Canvas and SCC-1 when connected to a Roland
MPU interface or compatible.  The Roland SCC-1
card does not require a MIDI interface card.
There are other patches made by hard working 
Sierra musicians to allow General MIDI support 
for D-110/10/20's, Proteus 1 and other devices.  
Let us know what you have and maybe we'll make 
a patch.  
Have Fun!


\\Genmidmv.drv
General MIDI for ProAudio Spectrum MIDI interface
\\Genmidmv.hlp
General MIDI for ProAudio Spectrum MIDI interface

This driver follows the IMA spec for General MIDI.
This will work on such devices as the Roland 
Sound Canvas when connected to the MediaVision
ProAudio Spectrum MIDI interface.  There are other
patches made by hard working Sierra musicians to 
allow General MIDI support for D-110/10/20's, 
Proteus 1 and other devices.  Let us know what you 
have and  maybe we'll make a patch.  
Have Fun!


\\mt32mv.drv
Roland MT-32 for ProAudio Spectrum MIDI interface
\\mt32mv.hlp
Roland MT-32 for ProAudio Spectrum MIDI interface

This driver will work with a Roland MT-32, MT-100,
CM-32L, or CM-64 synthesizer when connected to 
the MediaVision ProAudio Spectrum MIDI interface.
